General or ambient lighting is intended to light up a room in its entirety. It provides a uniform level of illumination throughout the space independently of other lighting sources.
Moreover, its purpose is to ensure safe and easy traffic, as well as to create an overview of the room. The ambient light ‘bounces’ off the walls to illuminate as much